Center at RA 09 48 57.32011800 DEC 00 22 25.5596350

CONT: J0948+00 IPOL 22245.000 MHZ J0948+0022.DIFMAP.2

Plot file version 1 created 24-SEP-2009 14:15:22

Grey scale flux range= 0.10 19.18 MilliJY/BEAM

GREY: J0948+00 PPOL 22245.000 MHZ J0948+00.POLINT.2

Peak contour flux = 5.2440E-01 JY/BEAM Levs = 1.000E-03 * (-4, 4, 12, 48, 144, 432)

PIXELS

PIXELS

50 100 150 200 250 300 350 400 450 500

50045040035030025020015010050 Pol line 1 milli arcsec = 8.0000E-02 JY/BEAM